From fd5f97a5b688096ada9d34459bab42c417eec82b Mon Sep 17 00:00:00 2001
From: Zéro~Informatique
Date: Sun, 26 Mar 2023 00:29:32 +0100
Subject: viewer: cannot scroll in text viewer

GitHub: closes #360
---
 viewer/src/views/item_handlers/PlainTextViewer.vue | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'viewer/src/views/item_handlers/PlainTextViewer.vue')

diff --git a/viewer/src/views/item_handlers/PlainTextViewer.vue b/viewer/src/views/item_handlers/PlainTextViewer.vue
index 2ab429a..986e0ae 100644
--- a/viewer/src/views/item_handlers/PlainTextViewer.vue
+++ b/viewer/src/views/item_handlers/PlainTextViewer.vue
@@ -26,6 +26,7 @@
   >
     <pre
       v-if="isFinished"
+      class="scrollbar"
       v-text="data"
     />
     <LdLoading v-else />
@@ -63,7 +64,7 @@ const { isFinished, data } = useFetch(itemResourceUrl).text();
     border: none;
     white-space: pre-wrap;
     resize: horizontal; // Allow the user to adjust the width of the text view for easier column reading.
-    overflow: hidden; // Necessary for the resize handle to be shown in Chromium.
+    overflow-x: hidden !important; // Necessary for the resize handle to be shown in Chromium.
   }
 }
 </style>
-- 
cgit v1.2.3

